/*
 * DESIGN: "Clinical Warmth"
 * Homepage principale della Clinica Veterinaria Formiginese
 * Assembla tutti i componenti in ordine logico:
 * Navbar → Hero → Servizi → Chi Siamo → Team → News → Prenotazione → Registrazione → Footer
 */
import Navbar from "@/components/Navbar";
import HeroSection from "@/components/HeroSection";
import ServicesSection from "@/components/ServicesSection";
import AboutSection from "@/components/AboutSection";
import TeamSection from "@/components/TeamSection";
import NewsSection from "@/components/NewsSection";
import BookingSection from "@/components/BookingSection";
import AuthSection from "@/components/AuthSection";
import Footer from "@/components/Footer";

export default function Home() {
  return (
    <div className="min-h-screen flex flex-col">
      <Navbar />
      <main className="flex-1">
        <HeroSection />
        <ServicesSection />
        <AboutSection />
        <TeamSection />
        <NewsSection />
        <BookingSection />
        <AuthSection />
      </main>
      <Footer />
    </div>
  );
}
